DELETE TP_SYS_FUNCTION WHERE FUNCTIONCODE LIKE '80%';
INSERT INTO "TP_SYS_FUNCTION"("FUNCTIONCODE", "FUNCTIONNAME", "FULLNAME", "FUNCTIONFLAG", "FUNCTIONBUTTONFLAG", "REMARK", "VALUEFLAG", "FORMNAME", "BUTTONNAME", "FUNCTIONLEVEL", "FUNCTIONPROGRAM", "IS_PDA", "IS_PC", "URL", "IS_WEB") VALUES ('80', 'HEGII', 'HEGII', '0', '0', NULL, '1', NULL, NULL, '80', '0', '0', '0', NULL, '1');
INSERT INTO "TP_SYS_FUNCTION"("FUNCTIONCODE", "FUNCTIONNAME", "FULLNAME", "FUNCTIONFLAG", "FUNCTIONBUTTONFLAG", "REMARK", "VALUEFLAG", "FORMNAME", "BUTTONNAME", "FUNCTIONLEVEL", "FUNCTIONPROGRAM", "IS_PDA", "IS_PC", "URL", "IS_WEB") VALUES ('8070', '统计报表', '统计报表', '0', '0', NULL, '1', NULL, NULL, '8070', '0', '0', '0', NULL, '1');
INSERT INTO "TP_SYS_FUNCTION"("FUNCTIONCODE", "FUNCTIONNAME", "FULLNAME", "FUNCTIONFLAG", "FUNCTIONBUTTONFLAG", "REMARK", "VALUEFLAG", "FORMNAME", "BUTTONNAME", "FUNCTIONLEVEL", "FUNCTIONPROGRAM", "IS_PDA", "IS_PC", "URL", "IS_WEB") VALUES ('807001', '注浆产品存坯汇总表', '统计报表-注浆产品存坯汇总表', '0', '0', NULL, '1', NULL, NULL, '807001', '0', '0', '0', 'rpt/rpt001/rpt_index.html', '1');
INSERT INTO "TP_SYS_FUNCTION"("FUNCTIONCODE", "FUNCTIONNAME", "FULLNAME", "FUNCTIONFLAG", "FUNCTIONBUTTONFLAG", "REMARK", "VALUEFLAG", "FORMNAME", "BUTTONNAME", "FUNCTIONLEVEL", "FUNCTIONPROGRAM", "IS_PDA", "IS_PC", "URL", "IS_WEB") VALUES ('807002', '成型工号存坯汇总表', '统计报表-成型工号存坯汇总表', '0', '0', NULL, '1', NULL, NULL, '807002', '0', '0', '0', 'rpt/rpt002/rpt_index.html', '1');
INSERT INTO "TP_SYS_FUNCTION"("FUNCTIONCODE", "FUNCTIONNAME", "FULLNAME", "FUNCTIONFLAG", "FUNCTIONBUTTONFLAG", "REMARK", "VALUEFLAG", "FORMNAME", "BUTTONNAME", "FUNCTIONLEVEL", "FUNCTIONPROGRAM", "IS_PDA", "IS_PC", "URL", "IS_WEB") VALUES ('807003', '包装预算数', '统计报表-包装预算数', '0', '0', NULL, '1', NULL, NULL, '807003', '0', '0', '0', 'rpt/rpt003/rpt_index.html', '1');
INSERT INTO "TP_SYS_FUNCTION"("FUNCTIONCODE", "FUNCTIONNAME", "FULLNAME", "FUNCTIONFLAG", "FUNCTIONBUTTONFLAG", "REMARK", "VALUEFLAG", "FORMNAME", "BUTTONNAME", "FUNCTIONLEVEL", "FUNCTIONPROGRAM", "IS_PDA", "IS_PC", "URL", "IS_WEB") VALUES ('807004', '在产产品汇总表', '统计报表-在产产品汇总表', '0', '0', NULL, '1', NULL, NULL, '807004', '0', '0', '0', 'rpt/rpt004/rpt_index.html', '1');
INSERT INTO "TP_SYS_FUNCTION"("FUNCTIONCODE", "FUNCTIONNAME", "FULLNAME", "FUNCTIONFLAG", "FUNCTIONBUTTONFLAG", "REMARK", "VALUEFLAG", "FORMNAME", "BUTTONNAME", "FUNCTIONLEVEL", "FUNCTIONPROGRAM", "IS_PDA", "IS_PC", "URL", "IS_WEB") VALUES ('807005', '工序产量分析表', '统计报表-工序产量分析表', '0', '0', NULL, '1', NULL, NULL, '807005', '0', '0', '0', 'rpt/rpt005/rpt_index.html', '1');
INSERT INTO "TP_SYS_FUNCTION"("FUNCTIONCODE", "FUNCTIONNAME", "FULLNAME", "FUNCTIONFLAG", "FUNCTIONBUTTONFLAG", "REMARK", "VALUEFLAG", "FORMNAME", "BUTTONNAME", "FUNCTIONLEVEL", "FUNCTIONPROGRAM", "IS_PDA", "IS_PC", "URL", "IS_WEB") VALUES ('8090', '系统管理', '系统管理', '0', '0', NULL, '1', NULL, NULL, '8090', '0', '0', '0', NULL, '1');
INSERT INTO "TP_SYS_FUNCTION"("FUNCTIONCODE", "FUNCTIONNAME", "FULLNAME", "FUNCTIONFLAG", "FUNCTIONBUTTONFLAG", "REMARK", "VALUEFLAG", "FORMNAME", "BUTTONNAME", "FUNCTIONLEVEL", "FUNCTIONPROGRAM", "IS_PDA", "IS_PC", "URL", "IS_WEB") VALUES ('809001', '系统功能管理', '系统管理-系统功能管理', '0', '0', NULL, '1', NULL, NULL, '809001', '0', '0', '0', 'sys/function/function_index.html', '1');
INSERT INTO "TP_SYS_FUNCTION"("FUNCTIONCODE", "FUNCTIONNAME", "FULLNAME", "FUNCTIONFLAG", "FUNCTIONBUTTONFLAG", "REMARK", "VALUEFLAG", "FORMNAME", "BUTTONNAME", "FUNCTIONLEVEL", "FUNCTIONPROGRAM", "IS_PDA", "IS_PC", "URL", "IS_WEB") VALUES ('809002', '权限范围类型', '系统管理-权限范围类型', '0', '0', NULL, '1', NULL, NULL, '809002', '0', '0', '0', 'sys/purviewtype/purviewtype_index.html', '1');
INSERT INTO "TP_SYS_FUNCTION"("FUNCTIONCODE", "FUNCTIONNAME", "FULLNAME", "FUNCTIONFLAG", "FUNCTIONBUTTONFLAG", "REMARK", "VALUEFLAG", "FORMNAME", "BUTTONNAME", "FUNCTIONLEVEL", "FUNCTIONPROGRAM", "IS_PDA", "IS_PC", "URL", "IS_WEB") VALUES ('809003', '用户管理', '系统管理-用户管理', '0', '0', NULL, '1', NULL, NULL, '809003', '0', '0', '0', 'mst/user/user_index.html', '1');
INSERT INTO "TP_SYS_FUNCTION"("FUNCTIONCODE", "FUNCTIONNAME", "FULLNAME", "FUNCTIONFLAG", "FUNCTIONBUTTONFLAG", "REMARK", "VALUEFLAG", "FORMNAME", "BUTTONNAME", "FUNCTIONLEVEL", "FUNCTIONPROGRAM", "IS_PDA", "IS_PC", "URL", "IS_WEB") VALUES ('809004', '职务管理', '系统管理-职务管理', '0', '0', NULL, '1', NULL, NULL, '809004', '0', '0', '0', 'mst/post/post_index.html', '1');
INSERT INTO "TP_SYS_FUNCTION"("FUNCTIONCODE", "FUNCTIONNAME", "FULLNAME", "FUNCTIONFLAG", "FUNCTIONBUTTONFLAG", "REMARK", "VALUEFLAG", "FORMNAME", "BUTTONNAME", "FUNCTIONLEVEL", "FUNCTIONPROGRAM", "IS_PDA", "IS_PC", "URL", "IS_WEB") VALUES ('809005', '机构管理', '系统管理-机构管理', '0', '0', NULL, '1', NULL, NULL, '809005', '0', '0', '0', 'mst/organization/organization_index.html', '1');
INSERT INTO "TP_SYS_FUNCTION"("FUNCTIONCODE", "FUNCTIONNAME", "FULLNAME", "FUNCTIONFLAG", "FUNCTIONBUTTONFLAG", "REMARK", "VALUEFLAG", "FORMNAME", "BUTTONNAME", "FUNCTIONLEVEL", "FUNCTIONPROGRAM", "IS_PDA", "IS_PC", "URL", "IS_WEB") VALUES ('809006', '缺陷类别管理', '系统管理-缺陷类别管理', '0', '0', NULL, '1', NULL, NULL, '809006', '1', '0', '0', 'mst/defecttype/defecttype_index.html', '1');
INSERT INTO "TP_SYS_FUNCTION"("FUNCTIONCODE", "FUNCTIONNAME", "FULLNAME", "FUNCTIONFLAG", "FUNCTIONBUTTONFLAG", "REMARK", "VALUEFLAG", "FORMNAME", "BUTTONNAME", "FUNCTIONLEVEL", "FUNCTIONPROGRAM", "IS_PDA", "IS_PC", "URL", "IS_WEB") VALUES ('809007', '缺陷管理', '系统管理-缺陷管理', '0', '0', NULL, '1', NULL, NULL, '809007', '1', '0', '0', 'mst/defect/defect_index.html', '1');
INSERT INTO "TP_SYS_FUNCTION"("FUNCTIONCODE", "FUNCTIONNAME", "FULLNAME", "FUNCTIONFLAG", "FUNCTIONBUTTONFLAG", "REMARK", "VALUEFLAG", "FORMNAME", "BUTTONNAME", "FUNCTIONLEVEL", "FUNCTIONPROGRAM", "IS_PDA", "IS_PC", "URL", "IS_WEB") VALUES ('809008', '工位类型管理', '系统管理-工位类型管理', '0', '0', NULL, '1', NULL, NULL, '809008', '1', '0', '0', 'sys/workstationtype/workstationtype_index.html', '1');
INSERT INTO "TP_SYS_FUNCTION"("FUNCTIONCODE", "FUNCTIONNAME", "FULLNAME", "FUNCTIONFLAG", "FUNCTIONBUTTONFLAG", "REMARK", "VALUEFLAG", "FORMNAME", "BUTTONNAME", "FUNCTIONLEVEL", "FUNCTIONPROGRAM", "IS_PDA", "IS_PC", "URL", "IS_WEB") VALUES ('809009', '工位管理', '系统管理-工位管理', '0', '0', NULL, '1', NULL, NULL, '809009', '1', '0', '0', 'mst/workstation/workstation_index.html', '1');
INSERT INTO "TP_SYS_FUNCTION"("FUNCTIONCODE", "FUNCTIONNAME", "FULLNAME", "FUNCTIONFLAG", "FUNCTIONBUTTONFLAG", "REMARK", "VALUEFLAG", "FORMNAME", "BUTTONNAME", "FUNCTIONLEVEL", "FUNCTIONPROGRAM", "IS_PDA", "IS_PC", "URL", "IS_WEB") VALUES ('809010', '工位工号', '系统管理-工位工号', '0', '0', NULL, '1', NULL, NULL, '809010', '1', '0', '0', 'mst/workstationuser/workstationuser_index.html', '1');
INSERT INTO "TP_SYS_FUNCTION"("FUNCTIONCODE", "FUNCTIONNAME", "FULLNAME", "FUNCTIONFLAG", "FUNCTIONBUTTONFLAG", "REMARK", "VALUEFLAG", "FORMNAME", "BUTTONNAME", "FUNCTIONLEVEL", "FUNCTIONPROGRAM", "IS_PDA", "IS_PC", "URL", "IS_WEB") VALUES ('809011', '工位工号关联', '系统管理-工位工号关联', '0', '0', NULL, '1', NULL, NULL, '809011', '1', '0', '0', 'mst/workstationuserdetail/workstationuserdetail_index.html', '1');
